The Postscript interpreter in your printer is 3010 This printout requires at least version 2015 or greater To make a Unix/Linux Gecko browser (eg: Netscape or Mozilla) produce output that will work on any level 2 interpreter change the "Print Command" to use Ghostscript to convert the output down to basic level 2; eg: change the print command from

lpr [OPTIONS] to (all on one line)

gs -q -sDEVICE=pswrite -sOutputFile=- -dNOPAUSE -dBATCH -dMozConvertedToLevel2=true - | lpr [OPTIONS]

for level 1 use:

gs -q -sDEVICE=pswrite -sOutputFile=- -dNOPAUSE -dBATCH -dLanguageLevel=1 -dMozConvertedToLevel1=true - | lpr [OPTIONS]

If you are printing this from a file use Ghostscript to convert it to basic level 2; eg: change the print command from

lpr [OPTIONS] <FILENAME> to gs -q -sDEVICE=pswrite -sOutputFile=- -dNOPAUSE -dBATCH -dMozConvertedToLevel2=true <FILENAME> | lpr [OPTIONS]

for level 1 use:

gs -q -sDEVICE=pswrite -sOutputFile=- -dNOPAUSE -dBATCH -dLanguageLevel=1 -dMozConvertedToLevel1=true <FILENAME> | lpr [OPTIONS]